Asynchronous

Asynchronous

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5

-100 -80 -60 -40 -20 0 20 40 60 80 100

Delay (ms)

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5

-100 -80 -60 -40 -20 0 20 40 60 80 100

Delay (ms)

-0.1

-0.08

-0.06

-0.04

-0.02 0 0.02

0.04

0.06

0.08 0.1

-20 -15 -10 -5 0 5 10 15 20

Delay (ms)

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5

-100 -80 -60 -40 -20 0 20 40 60 80 100

Delay (ms)

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5

-100 -80 -60 -40 -20 0 20 40 60 80 100

Delay (ms)

-0.1

-0.08

-0.06

-0.04

-0.02 0 0.02

0.04

0.06

0.08 0.1

-20 -15 -10 -5 0 5 10 15 20

Delay (ms)

Remote Pass Proximate Pass Difference