-4E-05

-2E-05

0

2E-05

4E-05

0 100 200 300 400 500 600 700 800 ms

Local field potential

-4E-05

-2E-05

0

2E-05

4E-05

0 100 200 300 400 500 600 700 800 ms

-4E-05

-2E-05

0

2E-05

4E-05

0 100 200 300 400 500 600 700 800 ms

0 1E-12

2E-12

3E-12

4E-12

5E-12

6E-12

0 10 20 30 40 50 60 70 80 Hz

Power

0 1E-12

2E-12

3E-12

4E-12

5E-12

6E-12

0 10 20 30 40 50 60 70 80 Hz

0 1E-12

2E-12

3E-12

4E-12

5E-12

6E-12

0 10 20 30 40 50 60 70 80 Hz

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5

-100 -80 -60 -40 -20 0 20 40 60 80 100

Delay (ms)

Pulse cross correlation

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5

-100 -80 -60 -40 -20 0 20 40 60 80 100

Delay (ms)

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5

-100 -80 -60 -40 -20 0 20 40 60 80 100

Delay (ms)