Hz

Hz

Hz

Delay (ms)

Delay (ms)

Delay (ms)

0 1E-13

2E-13

3E-13

4E-13

5E-13

0 10 20 30 40 50 60 70 80

0 2E-13

4E-13

6E-13

8E-13

0 10 20 30 40 50 60 70 80

0

5E-13

1E-12

1.5E-12

0 10 20 30 40 50 60 70 80

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

-100 -50 0 50 100

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

-100 -50 0 50 100

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

-100 -50 0 50 100

Qns Qs

5, 0.003

Qns Qs

10, 0.007

Qns Qs

20, 0.01

Pulse cross correlation

Pulse cross correlation

Pulse cross correlation

Power

Power

Power