0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

Zero-lag Correlation

0 0.002 0.004 0.006 0.008 0.01 0.012 0.014 0.016

Noise / Signal ratio

mean mean

Qns = 20 Qns = 5